<template>
	<z-paging ref="paging" @query="queryList" v-model="dataList" :default-page-size="queryParams.pageSize"
		:auto-show-system-loading="true" empty-view-text="抱歉，暂时还没有相关数据！">
		<template #top>
			<custom-nav-bar :left="true" title="业务明细">
			</custom-nav-bar>
			<view style="background: #e7fdeb;padding: 5px;">
				<u-search placeholder="请输入设备编号" v-model="queryParams.deviceCode" @search="queryList" shape="square"
					@custom="queryList" />
			</view>
		</template>
		<view class="index-container">
			<view class="item-container" v-for="item in dataList">
				<view style="display: flex; align-items: center; justify-content: space-between;">
					<view class="flex-text" style="margin: 15px;">
						<view class="flex-text-one" style="color: black;">设备编号：</view>
						<view>{{ item.deviceCode}}</view>
					</view>
				</view>
				<u-gap height="1" bgColor="#D2D2D2"></u-gap>
				<view style="display: flex;justify-content: space-between;align-items: center;">
					<view class="data">
						<view class="flex-text global-font-size-1">
							<view class="flex-text-one">设备类型：</view>
							<view>{{ item.deviceTypeName}}</view>
						</view>
						<view class="flex-text global-font-size-1" style="margin-top: 5px;">
							<view class="flex-text-one">操作人：</view>
							<view>{{ item.operUser}}</view>
						</view>
						<view class="flex-text global-font-size-1" style="margin-top: 5px;">
							<view class="flex-text-one">业务类型：</view>
							<view>{{ item.billTypeName}}</view>
						</view>
						<view class="flex-text global-font-size-1" style="margin-top: 5px;">
							<view class="flex-text-one">业务时间：</view>
							<view>{{ item.occurTime}}</view>
						</view>
					</view>
				</view>
			</view>
		</view>
	</z-paging>
</template>
<script>
	import store from "@/store"
	import {
		getDeviceBillWmsList
	} from "@/api/iot/deviceBillWms.js"
	export default {
		data() {
			return {
				dataList: [],
				queryParams: {
					billDetailIds: null,
					deviceTypeId:null,
					pageNum: 1,
					pageSize: 20,
					deviceCode: "",
				}
			}
		},
		onLoad(options) {
			if(options){
				this.queryParams.billDetailIds = options.ids+",".split(",");
				this.queryParams.deviceTypeId =options.deviceTypeId;
			}
		},
		onShow() {},
		mounted() {},
		methods: {
			maskClick(e) {},
			queryList(pageNo, pageSize) {
				this.queryParams.pageNum = pageNo;
				getDeviceBillWmsList(this.queryParams).then(res => {
					this.$refs.paging.completeByTotal(res.rows, res.total);
				});
			},
		}
	}
</script>

<style lang="scss">
	.index-container {
		.list {
			margin: 0px 10px;
		}

		.list-size {
			display: flex;
			padding: 5px 5px;
			background: white;
			justify-content: center;
		}

		.search {
			background-color: white;
			padding: 10px;
		}

		.item-container {
			margin: 10px 10px;
			background-color: white;
			padding-bottom: 10px;
			border-radius: 10px;
			box-shadow: 1px 1px 2px 2px rgba(0, 0, 0, 0.05);
		}

		.flex-text {
			display: flex;
			align-items: center;

			.flex-text-one {
				color: #939393;
				font-weight: bold;
			}
		}

		.data {
			margin: 10px 20px;
		}
	}
</style>